IMPORTANT INFORMATION ABOUT

MABRY SOFTWARE AND OUR CONTROLS

Please Read This Short Document

This file covers the following topics:

*	EVERY CONTROL HAS ITS OWN HELP FILE.

*	EVERY CONTROL HAS AT LEAST ONE SAMPLE VISUAL BASIC PROJECT TO ILLUSTRATE THE USE OF THE CONTROL.

*	REGISTERED USERS CAN OBTAIN FREE UPDATES VIA E-MAIL.

*	MABRY SOFTWARE NEWSLETTER -  SEND US YOUR E-MAIL ADDRESS.

*	NO RUN-TIME FEES!

*	DO NOT DISTRIBUTE THE MABRY LICENSE FILE WITH YOUR APPLICATION.

EVERY CONTROL HAS ITS OWN HELP FILE.

The help (.HLP) file is in the \WINDOWS\SYSTEM directory. This is the file that contains descriptions of the properties, methods, and events of the Mabry control.  It is available in VB by positioning the cursor over the control's icon, clicking, and then pressing F1. The HLP file is also available through WinHelp. Typical help file names are MMFTP.HLP, PERCNT.HLP, HITIME.HLP, MMAIL.HLP ...

EVERY CONTROL HAS AT LEAST ONE SAMPLE VISUAL BASIC PROJECT TO ILLUSTRATE THE USE OF THE CONTROL

The sample projects are stored in the \mabry\sample directory (unless you chose a different directory at installation time).  For example, if you are using BARCOD1.VBX, look in the \MABRY\SAMPLE\VBX directory.  BarCod  has 3 sample projects - BARCODS1.MAK, BARCODS2.MAK, and BARCODS3.MAK. Before you call us for technical support, please try all of the samples associated with the control you have purchased. The samples have been tested and work reliably on almost every system.

REGISTERED USERS CAN OBTAIN FREE UPDATES VIA E-MAIL.

If you are a registered user, you can obtain free updates and bug fixes for your controls via e-mail. If you are interested in this service, please send e-mail to 76421.526@compuserve.com, requesting information on obtaining updates.

MABRY SOFTWARE NEWSLETTER -  SEND US YOUR E-MAIL ADDRESS.

We want to inform all of our users of updates, bug fixes, new products, etc. We do this via an e-mail newsletter, so please make sure that we have your e-mail address on file. Send the information to 76421.526@compuserve.com.

NO RUN-TIME FEES!

If you distribute Mabry controls embedded in your APP.EXE (in other words, not available to your end-user at design time), our controls have no run-time royalty fees. However, each developer/programmer working on a project containing a Mabry control must purchase a license.

DO NOT DISTRIBUTE THE MABRY LICENSE FILE WITH YOUR APPLICATION

If you distribute the .LIC file, you are giving our controls away.   Mabry controls are designed to work at run-time without a license.